
   $$
      \lim_{x\to0}\frac{\tan x}x =
      \lim_{x\to0}\frac{\sin x}{x \cos x} =
      \lim_{x\to0}\frac{\sin x}x \cdot
      \lim_{x\to0}\frac1{\cos x} = 1.
   $$